UPDATE sensors
SET
  sensor_id = $1,
  sensor_name = $2,
  sensor_location = $3,
  wire_id = $4,
  i2c_bus = $5,
  i2c_address = $6,
  gpio_number = $7,
  sensor_model = $8,
  sensor_enabled = $9,
  device_id = $10,
  creation_date = $11
WHERE
  sensor_id = $12;