INSERT INTO sensors (
  sensor_id,
  sensor_name,
  sensor_location,
  wire_id,
  i2c_bus,
  i2c_address,
  gpio_number,
  sensor_model,
  sensor_enabled,
  device_id,
  creation_date
)
VALUES ($1, $2, $3, $4, $5, $6, $7, $8, $9, $10, $11);
