INSERT INTO sensors (
  sensor_id,
  sensor_name,
  sensor_location,
  wire_id,
  i2c_bus,
  i2c_address,
  gpio_number,
  sensor_model,
  sensor_enabled,
  tick_duration,
  device_id,
  creation_date,
  update_date
)
VALUES ($1, $2, $3, $4, $5, $6, $7, $8, $9, $10, $11, $12, $13)
ON CONFLICT (sensor_id)
DO
  UPDATE SET
    sensor_name = EXCLUDED.sensor_name,
    sensor_location = EXCLUDED.sensor_location,
    wire_id = EXCLUDED.wire_id,
    i2c_bus = EXCLUDED.i2c_bus,
    i2c_address = EXCLUDED.i2c_address,
    gpio_number = EXCLUDED.gpio_number,
    sensor_model = EXCLUDED.sensor_model,
    sensor_enabled = EXCLUDED.sensor_enabled,
    tick_duration = EXCLUDED.tick_duration,
    device_id = EXCLUDED.device_id,
    creation_date = EXCLUDED.creation_date,
    update_date = date('now');
