UPDATE sensors
SET
  sensor_name = $1,
  sensor_location = $2,
  wire_id = $3,
  i2c_bus = $4,
  i2c_address = $5,
  gpio_number = $6,
  sensor_model = $7,
  sensor_enabled = $8,
  tick_duration = $9,
  device_id = $10,
  creation_date = $11,
  update_date = $12
WHERE
  sensor_id = $13;